(GeV/c)

Tgen p 0 10 20 30 40 50 60 70 80 90 100 p 0

0.2

0.4

0.6

0.8

1 |<1.04 η DT: |

cut: TP 10 GeV/c 20 GeV/c 30 GeV/c 40 GeV/c

η

(GeV/c)

Tgen p 0 10 20 30 40 50 60 70 80 90 100 p 0

0.2

0.4

0.6

0.8

1 |<2.1 η CSC: 1.04<|

cut: TP 10 GeV/c 20 GeV/c 30 GeV/c 40 GeV/c

η

(GeV/c)

Tgen p 0 10 20 30 40 50 60 70 80 90 100 p 0

0.2

0.4

0.6

0.8

1 |<1.04 η RPC: |

cut: TP 10 GeV/c 20 GeV/c 30 GeV/c 40 GeV/c

η

(GeV/c)

Tgen p 0 10 20 30 40 50 60 70 80 90 100 p 0

0.2

0.4

0.6

0.8

1 |<2.1 η RPC: 1.04<|

cut: TP 10 GeV/c 20 GeV/c 30 GeV/c 40 GeV/c

η

(GeV/c)

Tgen p 0 10 20 30 40 50 60 70 80 90 100 p 0

0.2

0.4

0.6

0.8

1 |<1.04 η GMT: |

cut: TP 10 GeV/c 20 GeV/c 30 GeV/c 40 GeV/c

η

(GeV/c)

Tgen p 0 10 20 30 40 50 60 70 80 90 100 p 0

0.2

0.4

0.6

0.8

1 |<2.1 η GMT: 1.04<|

cut: TP 10 GeV/c 20 GeV/c 30 GeV/c 40 GeV/c

η