0 0.5 1 1.5 2 2.5 0

0.2

0.4

0.6

0.8

1

0

1

Max Q Q 1 Q 2 Q 3 Q 4 Q 5 Q 6 Q 7 DT

0 0.5 1 1.5 2 2.5 0

0.2

0.4

0.6

0.8

1

0

1

Max Q Q 1 Q 2 Q 3 CSC

0 0.5 1 1.5 2 2.5 0

0.2

0.4

0.6

0.8

1

0

1

Max Q Q 0 Q 1 Q 2 Q 3 RPC

0 0.5 1 1.5 2 2.5 0

0.2

0.4

0.6

0.8

1

0

1

Max Q Q 1 Q 2 Q 3 Q 4 Q 5 Q 6 Q 7 GMT-OR