Entries 10759 Mean -0.1926 RMS 0.2194 Underflow 0 Overflow 241 / ndf

2χ 69.46 / 37 Constant 5.8±

434.8 Mean 0.0021 ± -0.2033 Sigma 0.0019 ± 0.1848

Tgen )*p Tgen

-1/p

Trec

(1/p

-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1 0

100

200

300

400

500

± ±

Ptgen[0]/Ptc-1. {Bxc==0 && Qualc>1 && abs(Etagen[0])>1.2 && Ptgen[0]<35.}