Entries 10299 Mean -0.1928 RMS 0.2204 Underflow 0 Overflow 225 / ndf

2χ 77.32 / 37 Constant 5.7±

414.5 Mean 0.0021 ± -0.2034 Sigma 0.0020 ± 0.1856

Tgen )*p Tgen

-1/p

Trec

(1/p

-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1 0 50 100 150 200 250 300 350 400 450

± ±

Ptgen[0]/Ptc-1. {Bxc==0 && Qualc>1 && abs(Etagen[0])>1.2 && Ptgen[0]<35.}