Tgen )*p Tgen

-1/p

Trec

(1/p

-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1 0

200

400

600

800

1000

1200

Ptgen[0]/Ptc-1. {Qualc>1 && abs(Etagen[0])>1.2}Entries 33182

Mean -0.1506 RMS 0.2745 Underflow 0 Overflow 1401

Ptgen[0]/Ptc-1. {Qualc>1 && abs(Etagen[0])>1.2}