|_{gen} η| 0 0.5 1 1.5 2 2.5 0

0.2

0.4

0.6

0.8

0.11)% ± |<1.04)= (95.24 η DT eff(| 0.06)% ± |>1.04)= (98.09 η CSC eff(| 0.10)% ± |<2.10)= (91.53 η RPC eff(| 0.04)% ± |<2.40)= (98.34 η GMT eff(| 0.05)% ± |<2.10)= (97.82 η GMT+ eff(|